From dbd5f6fccededb3bd18791eac43fd88d36e90f00 Mon Sep 17 00:00:00 2001
From: Francisco Redondo Marchena <francisco.marchena@codethink.co.uk>
Date: Thu, 28 Jun 2018 12:31:56 +0100
Subject: freetype2-harfbuzz: remove this element

This element was the same as freetype2. It was tracking the same
tag and reference.
This patch removes this element and replaces it by freetype2
in elements which depends on it.
---
 elements/graphics-common/freetype2-harfbuzz.bst | 11 -----------
 1 file changed, 11 deletions(-)
 delete mode 100644 elements/graphics-common/freetype2-harfbuzz.bst

(limited to 'elements/graphics-common/freetype2-harfbuzz.bst')

diff --git a/elements/graphics-common/freetype2-harfbuzz.bst b/elements/graphics-common/freetype2-harfbuzz.bst
deleted file mode 100644
index ee6af4b8..00000000
--- a/elements/graphics-common/freetype2-harfbuzz.bst
+++ /dev/null
@@ -1,11 +0,0 @@
-kind: autotools
-depends:
-- glib-common.bst
-- mesa-common.bst
-- x-common.bst
-- icu-common.bst
-sources:
-- kind: git
-  url: upstream:freetype2
-  track: VER-2-6-2
-  ref: 66cf29b1bc869b44863b0de2115bd017dfcce849
-- 
cgit v1.2.1

