kind: autotools
depends:
- device-management.bst
- foundation.bst
- glib-common.bst
- xorg-util-macros-common.bst
- x-common.bst
- input-common/mtdev.bst
- input-common/libevdev.bst
- input-common/libwacom.bst
sources:
- kind: git
  url: upstream:libinput
  track: 1.8.0
  ref: 401728a1574ef886ddb7fa19cd8ed196420d7931
config:
  configure-commands:
  - NOCONFIGURE=1 ./autogen.sh
  - ./configure --prefix="%{prefix}" --disable-documentation --disable-debug-gui --disable-tests
