kind: autotools
depends:
- foundation.bst
- llvm-common.bst
- libdrm-common.bst
- wayland-generic.bst
- python2-core.bst
- x-common.bst
sources:
- kind: git
  url: upstream:mesa
  track: mesa-17.1.3
  ref: f60875e211388e299724063af40c01738cc5d819
config:
  configure-commands:
  - |
    cpu=$(echo $(gcc -dumpmachine) | cut -d '-' -f 1)
    case "$cpu" in
    arm*)
      DRIDRIVERS=no
      GALLIUMDRIVERS=nouveau,freedreno,svga,swrast,vc4
      VULKANDRIVERS=no
      ;;
    *)
      DRIDRIVERS=yes
      GALLIUMDRIVERS=r300,svga,swrast,virgl,swr
      VULKANDRIVERS=intel
      ;;
    esac
    ./autogen.sh --prefix="%{prefix}" --sysconfdir=/etc \
        --enable-gles2 \
        --with-egl-platforms=drm,wayland,x11 \
        --with-vulkan-drivers="$VULKANDRIVERS" \
        --with-gallium-drivers="$GALLIUMDRIVERS" \
        --with-dri-drivers="$DRIDRIVERS"
