From ce017d8f1f3663883c8ac34b3fb485e5b177ff9d Mon Sep 17 00:00:00 2001
From: Thomas Wouters <thomas@python.org>
Date: Sun, 16 Jul 2000 19:01:10 +0000
Subject: Rob W. W. Hooft's spelling fixes for the Library Reference. I hope
 SourceForge doesn't choke on this batch :-)

I'm not entirely sure this is 100% correct. The patch changes an
\index{persistency} to \index{presistence}, and I don't know what \index{}
does. But it seems to do so persi--er, consistently, so I hope it isn't a
problem.
---
 Doc/lib/libtraceback.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'Doc/lib/libtraceback.tex')

diff --git a/Doc/lib/libtraceback.tex b/Doc/lib/libtraceback.tex
index 20dc019fee..a9a3ffe824 100644
--- a/Doc/lib/libtraceback.tex
+++ b/Doc/lib/libtraceback.tex
@@ -104,7 +104,7 @@ Format a stack trace and the exception information.  The arguments
 have the same meaning as the corresponding arguments to
 \function{print_exception()}.  The return value is a list of strings,
 each ending in a newline and some containing internal newlines.  When
-these lines are contatenated and printed, exactly the same text is
+these lines are concatenated and printed, exactly the same text is
 printed as does \function{print_exception()}.
 \end{funcdesc}
 
-- 
cgit v1.2.1

