<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">/* Copyright (C) 2001, 2002, 2003, 2006, 2008 Free Software Foundation, Inc.

This file is part of GCC.

GCC is free software; you can redistribute it and/or modify it under
the terms of the GNU General Public License as published by the Free
Software Foundation; either version 3, or (at your option) any later
version.

GCC is distributed in the hope that it will be useful, but WITHOUT ANY
WARRANTY; without even the implied warranty of MERCHANTABILITY or
FITNESS FOR A PARTICULAR PURPOSE.  See the GNU General Public License
for more details.

You should have received a copy of the GNU General Public License
along with GCC; see the file COPYING3.  If not see
&lt;http://www.gnu.org/licenses/&gt;.  */

/* DK_UNSPECIFIED must be first so it has a value of zero.  We never
   assign this kind to an actual diagnostic, we only use this in
   variables that can hold a kind, to mean they have yet to have a
   kind specified.  I.e. they're uninitialized.  Within the diagnostic
   machinery, this kind also means "don't change the existing kind",
   meaning "no change is specified".  */
DEFINE_DIAGNOSTIC_KIND (DK_UNSPECIFIED, "")

/* If a diagnostic is set to DK_IGNORED, it won't get reported at all.
   This is used by the diagnostic machinery when it wants to disable a
   diagnostic without disabling the option which causes it.  */
DEFINE_DIAGNOSTIC_KIND (DK_IGNORED, "")

/* The remainder are real diagnostic types.  */
DEFINE_DIAGNOSTIC_KIND (DK_FATAL, "fatal error: ")
DEFINE_DIAGNOSTIC_KIND (DK_ICE, "internal compiler error: ")
DEFINE_DIAGNOSTIC_KIND (DK_ERROR, "error: ")
DEFINE_DIAGNOSTIC_KIND (DK_SORRY, "sorry, unimplemented: ")
DEFINE_DIAGNOSTIC_KIND (DK_WARNING, "warning: ")
DEFINE_DIAGNOSTIC_KIND (DK_ANACHRONISM, "anachronism: ")
DEFINE_DIAGNOSTIC_KIND (DK_NOTE, "note: ")
DEFINE_DIAGNOSTIC_KIND (DK_DEBUG, "debug: ")
/* These two would be re-classified as DK_WARNING or DK_ERROR, so the
prefix does not matter.  */
DEFINE_DIAGNOSTIC_KIND (DK_PEDWARN, "pedwarn: ")
DEFINE_DIAGNOSTIC_KIND (DK_PERMERROR, "permerror: ")

</pre></body></html>