/* This file contains the definitions for timing variables used to -*- C -*-
   measure run-time performance of the compiler.

   Copyright (C) 2002, 2007, 2009-2015, 2018-2019 Free Software Foundation,
   Inc.

   Contributed by Akim Demaille <akim@freefriends.org>.

   This program is free software: you can redistribute it and/or modify
   it under the terms of the GNU General Public License as published by
   the Free Software Foundation, either version 3 of the License, or
   (at your option) any later version.

   This program is distributed in the hope that it will be useful,
   but WITHOUT ANY WARRANTY; without even the implied warranty of
   MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
   GNU General Public License for more details.

   You should have received a copy of the GNU General Public License
   along with this program.  If not, see <http://www.gnu.org/licenses/>.  */

/* This file contains the list of timing variable definitions, used by
   timevar.h and timevar.c.

   Syntax:

     DEFTIMEVAR (Id, Name)

   where:

   - Id is the value used to identify the timing variable.
     It's an enum value, i.e., behaves like a nonnegative integer.
     It is used only the manipulate the timer: the user of the
     program will never see this identifier.

   - Name is a string describing its purpose.  This string
     will be presented to the user in the timing tables.  It does not
     need to be a literal, you may for instance use gettext.

   The order of this list matters: that is the order in which the
   timing table is printed, except that 'tv_total' is printed last.
  */

/* The total execution time.  Mandatory.  */
DEFTIMEVAR (tv_total,      "total time")

/* Examples.  */
DEFTIMEVAR (tv_read,       "read")
DEFTIMEVAR (tv_work,       "work")
DEFTIMEVAR (tv_work_1,     "work: phase 1")
DEFTIMEVAR (tv_work_2,     "work: phase 2")
DEFTIMEVAR (tv_output,     "output")
