From 2e0bad8fc7f9ae2833a899f65b011af4e0610035 Mon Sep 17 00:00:00 2001
From: Alexander Barkov <bar@mariadb.com>
Date: Sun, 21 Oct 2018 05:14:02 +0400
Subject: Disabling test ctype_ldml temporary: MDEV-17511 revealed a wrong test
 fragment

---
 mysql-test/main/disabled.def | 1 +
 1 file changed, 1 insertion(+)

(limited to 'mysql-test/main/disabled.def')

diff --git a/mysql-test/main/disabled.def b/mysql-test/main/disabled.def
index e83ff00d10b..8fd4f86f778 100644
--- a/mysql-test/main/disabled.def
+++ b/mysql-test/main/disabled.def
@@ -22,3 +22,4 @@ innodb_bug12902967       : broken upstream
 file_contents            : MDEV-6526 these files are not installed anymore
 max_statement_time       : cannot possibly work, depends on timing
 connect-abstract         : waiting for libmariadb update
+ctype_ldml               : MDEV-17511 revealed a wrong test
-- 
cgit v1.2.1

