From 2e8dc5fff4a743627003ca96e3740ffc0ef757e8 Mon Sep 17 00:00:00 2001
From: unknown <jani@a193-229-222-105.elisa-laajakaista.fi>
Date: Tue, 13 Dec 2005 17:53:26 +0200
Subject: Increased stack size for clients on Netware. New libc suggests doing
 this.

---
 netware/myisamlog.def | 1 +
 1 file changed, 1 insertion(+)

(limited to 'netware/myisamlog.def')

diff --git a/netware/myisamlog.def b/netware/myisamlog.def
index 5c4cbb23361..b146b9c015e 100644
--- a/netware/myisamlog.def
+++ b/netware/myisamlog.def
@@ -6,6 +6,7 @@ SCREENNAME "MySQL MyISAM Table Log Tool"
 COPYRIGHT "(c) 2003 Novell, Inc. Portions (c) 2003 MySQL AB. All Rights Reserved."
 DESCRIPTION "MySQL MyISAM Table Log Tool"
 VERSION 4, 0
+STACKSIZE 32768
 XDCDATA ../netware/mysql.xdc
 #DEBUG
 
-- 
cgit v1.2.1

