From fb5abf8f4f555ffd2363305a78346d5f9449b989 Mon Sep 17 00:00:00 2001
From: "kent@mysql.com/kent-amd64.(none)" <>
Date: Fri, 1 Dec 2006 23:09:14 +0100
Subject: mysql_upgrade.def Makefile.am:   Added new "mysql_upgrade.def" for
 Netware (bug#23504) *.def:   Allocate 128K stack for all executables
 (bug#23504)

---
 netware/perror.def | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'netware/perror.def')

diff --git a/netware/perror.def b/netware/perror.def
index d67bd6191b4..fc95de3476a 100644
--- a/netware/perror.def
+++ b/netware/perror.def
@@ -5,7 +5,7 @@ MODULE	libc.nlm
 COPYRIGHT "(c) 2003-2005 Novell, Inc. Portions (c) 2003 MySQL AB. All Rights Reserved."
 DESCRIPTION "MySQL Error Code Description Tool"
 VERSION 4, 0
-STACKSIZE 32768
+STACKSIZE 131072
 XDCDATA ../netware/mysql.xdc
 #DEBUG
 
-- 
cgit v1.2.1

