##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

gis_split_inf : MDEV-14057 InnoDB GIS tests fail
row_format : MDEV-14057 InnoDB GIS tests fail
rtree_estimate : MDEV-14057 InnoDB GIS tests fail
rtree_multi_pk : MDEV-14057 InnoDB GIS tests fail
rtree_recovery : MDEV-14058 InnoDB Assertion failure !leaf on rem0rec.cc line 566 on test innodb_gis.rtree_recovery
tree_search : MDEV-14057 InnoDB GIS tests fail
rtree_concurrent_srch: MDEV-14059 InnoDB assertion failure offset >= ((38U + 36 + 2 * 10) + 5) at page0page.h line 318
point_big : MDEV-14057 InnoDB GIS tests fail
geometry : MDEV-14057 InnoDB GIS tests fail
bug17057168 : MDEV-14057 InnoDB GIS tests fail
bug16236208 : MDEV-14057 InnoDB GIS tests fail
bug16266012 : MDEV-14057 InnoDB GIS tests fail
rtree_search : MDEV-14057 InnoDB GIS tests fail
rtree_old : MDEV-14057 InnoDB GIS tests fail
