From 40fcbb5f0a70171193891c863a325f31291f16f7 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?S=C3=A9bastien=20Hinderer?= <Sebastien.Hinderer@inria.fr>
Date: Tue, 28 Mar 2017 17:04:35 +0200
Subject: Move configuration header files from the config to the byterun/caml
 directory

This commit moves:
  - config/m.h to byterun/caml/m.h
  - config/s.h to byterun/caml/s.h

Consequently, m.h and s.h now get installed alongside other
OCaml header files.

This commit also updates the .depend files, introducing updates in the
dependencies which are not consequences of this commit itself.
---
 INSTALL.adoc | 9 +++++----
 1 file changed, 5 insertions(+), 4 deletions(-)

(limited to 'INSTALL.adoc')

diff --git a/INSTALL.adoc b/INSTALL.adoc
index ca275efeb5..03a00b6229 100644
--- a/INSTALL.adoc
+++ b/INSTALL.adoc
@@ -25,8 +25,8 @@
 
         ./configure
 +
-This generates the three configuration files `Makefile`, `m.h` and `s.h`
-in the `config/` subdirectory.
+This generates the three configuration files `config/Makefile`,
+`byterun/caml/m.h` and `byterun/caml/s.h`.
 +
 The `configure` script accepts the following options:
 +
@@ -313,8 +313,9 @@ In the latter case, the destination directory defaults to the
 Read the "common problems" and "machine-specific hints" section at the end of
 this file.
 
-Check the files `m.h` and `s.h` in `config/`. Wrong endianness or alignment
-constraints in `m.h` will immediately crash the bytecode interpreter.
+Check the files `m.h` and `s.h` in `byterun/caml/`.
+Wrong endianness or alignment constraints in `machine.h` will
+immediately crash the bytecode interpreter.
 
 If you get a "segmentation violation" signal, check the limits on the stack size
 and data segment size (type `limit` under csh or `ulimit -a` under bash). Make
-- 
cgit v1.2.1

