NAME

regression-380 - regression test for BUG#380 #380 manpage writer does not add space after .B ... somewhere in the sphinx pipeline something is ... failing Maybe the install subparser is a problem. Input extracted with standard argparse --- usage: tmpmain.py [-h] [--general GENERAL] foo bar {install} ... positional arguments:

foo foo help bar {install} System Message: ERROR/3 (input/optionstoo.txt:, line 23) Unexpected indentation.

install install help optional arguments:

-h, --help

show this help message and exit --general GENERAL, -G GENERAL General option -o FILE, --ouput FILE

output file NOTE "show" "General" and "output" on same column.

REGRESSION-380() REGRESSION-380()

REGRESSION-380()