From f5bb55cc14cc17bc4665347fe6c2e11145101624 Mon Sep 17 00:00:00 2001
From: Kornelius Kalnbach <murphy@rubychan.de>
Date: Sun, 7 Oct 2012 02:59:02 +0200
Subject: Fix HTML scanner: Don't crash if HTML in a diff contains a JavaScript
 tag.

---
 Changes.textile | 1 +
 1 file changed, 1 insertion(+)

(limited to 'Changes.textile')

diff --git a/Changes.textile b/Changes.textile
index d70c303..3326a71 100644
--- a/Changes.textile
+++ b/Changes.textile
@@ -7,6 +7,7 @@ p=. _This files lists all changes in the CodeRay library since the 0.9.8 release
 h2. Next Version
  
 * add @:string/:char@, remove @:regexp/:function@ color from Terminal encoder [GH #29, thanks to Kyrylo Silin]
+* Fix HTML scanner: Don't crash if HTML in a diff contains a JavaScript tag.
 
 h2. Changes in 1.0.7
  
-- 
cgit v1.2.1

